\subsection{Bruker D8}
\textit{Platforms: All}

\ \newline
This driver is for the D8 motor controller made by Bruker AXS and
distributed with goniostat systems from them.

\textbf{Warning:} This driver was only tested
			with a prerelease version of the D8.

\newcommand{\MxFieldDIRsCDCZrecord}%
{Record name of the serial port that is connected to this D8 controller.}
%
\ \newline
\textbf{\textit{d8} record fields}
\newline
\MxDIDriverFields

\newcommand{\MxFieldDIZmotorDIZrecord}%
{Record name of the D8 controller that this motor belongs to.}
\newcommand{\MxFieldDIZmotorDriveZnumber}
{Drive number of this axis.}
\newcommand{\MxFieldDIZmotorDIZspeed}%
{Initial speed of this D8 motor.}
%
\ \newline
\ \newline
\textbf{\textit{d8\_motor} record fields}
\newline
\MxDIZmotorDriverFields
