\section{DriverLINX Port I/O}

This MX driver is an interface to the DriverLINX port I/O driver for
Windows NT/98/95 written by Scientific Software Tools, Inc.  The 
DriverLINX package may be downloaded from
\MxLink{http://www.sstnet.com/dnload/dnload.htm}%
{http://www.sstnet.com/dnload/dnload.htm}.
This driver is primarily intended for use under Windows NT, since
the 'dos\_portio' driver already handles Windows 98/95, but it
should work on all three operating systems.

\textbf{Warning:}  These drivers have not yet been tested with
Windows 2000 or Windows XP.

