\section{EPICS Digital Output}
%
\textit{Module: \bf{epics.mxo}}
\newline

The MX \textit{epics\_doutput} record can be used to read the value
of any single EPICS PV into an MX digital output record.
Typically, this will be used for a PV that returns a single integer value.

\ \newline
\MxEpicsZdoutputDriverFields
\newline

